log1 0 (Ms/ Mp)

dilat on de cay m=1 0 0 Me V

string mass scale nucle os yn.

baryoge n.

crit ical de ns it y e quivale nce principle

log1 0 (m/ e V)

-4 4 8 13

0

-2.5

-5

-7.5

-10