de Sitter

 -7.5

 -10

-12.5

 -15

      0 2.5  5              7.5            10            12.5

log_{10} (ω / Hz) log_{10} (Ω_Gh^2100) δs= 99% δs= 0

ω3 ω3 ω3 ω4