-4 -3 -2 -1 0 1 2 3 4 5 6 7 0

5

10

15

20

τ δΨk δΨ_k, κ = 10^{-6}

δΨ_k, κ = 10^{-5} δ R_k × 10^9 κ =10^{-6}

δ Ψ_k ,κ= 2× 10^{-6}